%
%  CfA Proposal Template for time at FLWO/MMT/Magellan 
%
%  Use this template for all observing proposals.
%  No style file is required.
%
%  Version 1.1    8 October 2010
%  Changed topmargin from 0.25in to 0.5in (DJM 2010-10-08)
%
%%%  For information on CfA observing facilities please visit 
%    the CfA TAC web page: 
%
%%%  http://www.cfa.harvard.edu/~kenyon/TAC/ 
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%
%  The template begins here.  The font must be 12 point, the vertical
%  line spacing must be 12.5 point, and the margins must be at least 
%  1-inch on all sides.  
%
%  Do not override these limits
%
%  To produce a postscript file with better computer viewable fonts,
%  please use dvips -Ppdf -o file.ps file.dvi 
%
\documentclass[12pt]{article}
\usepackage{graphicx}

\pdfpagewidth 8.5in
\pdfpageheight 11in 

\linespread{1.042}
\normalsize
\textwidth=6.5in
\textheight=9.0in
\topmargin=-0.5in
\oddsidemargin=0.0in
\evensidemargin=0.0in
\pagenumbering{arabic}
\begin{document}

%%% The proposal consists of these sections:
%
%   Scientific justification & Experimental design: up to 2 pages of text
%   References, Figures, target list, and publications: up to 2 pages
%	

\section{Scientific Justification}

Describe the background and goals for your project.

\section{Experimental Design}

Describe the proposed observations and the targets.

\section{References}

List references in a separate section of within the first two sections.

\section{Figures} 

Include several figures with captions

To insert figures into your proposal, use the latex includegraphics command.

\section{Target List}

Include a table of targets if needed

\section{Previous Time Awards \& Publications}

List previous \& concurrent awards of time on CfA and other 
telescopes for this project. If appropriate, include references 
to several recent publications.  You can also include a total
number of publications.

\vskip 4ex
\noindent
{\bf Proposal Length: maximum of four pages}

\vskip 2ex
\noindent
Scientific Justification \& experimental design: two pages

\noindent
References, figures, target list, \& publications: two pages

\noindent
You may join sections together as appropriate.

\vskip 4ex
\noindent
{\bf Template layout and font size:} Please do not change the 
default point size of the type (12 pt), the line spacing, or 
the size of the margins (1" all sides).

\vskip 2ex
\noindent
As long as you maintain the page limits, font size, and margins, 
you may use another font style or template if you prefer.

\end{document}
